FR-GW

2 6

1 9 2 . 1 6 . 1 9 2

S 0

S 1

E0

E1

1 2 8 . 9 3 .

1 2 8

1 9 2 . 4 4 . 6 4 . F N E T 2 6

9

1 7

5 7

6 5

7 3

8 1

8 9

1 0 5

9 7

??????

???????

??????

??????

??????

??????

??????

??????

???????

1 9 2 . 3 3 . 1 5

CHORUS

1 3 2 . 2 7 7

IBP-NET

1 9 2 . 3 3 . 1 4 8

FNET-GRECO

1 9 2 . 4 4 . 6 3

FNET

1 2 9 . 1 7 5

PARIS-SUD

1 9 2 . 3 3 . 1 7 8

FNET

1 9 2 . 4 8 . 9 8

POLYCI

1 2 9 . 1 8 2

CL-BULL

1 9 2 . 3 3 . 1 5 6

UNIV-PARIS8

5

1 2 9 . 1 0 4

POLYTEC

????????

1 2 8 . 9 3 . 1

1 2 8 . 9 3 . 2

1 2 8 . 9 3 . 1 6

4

1 0

1

1

??????

???????

1 2 9 . 1 9 9

FNET-ENS-ULM

1 9 2 . 3 3 . 1 6 6

FNET

1 9 2 . 3 1 . 2 7

INRIA-ALTAIR

1 9 2 . 5 . 5 9

INRIA-SM90

MINSY-POE

1 2 6 . 0 . 0 . (???) 1

129.20. VERDUR

131.254. IRISIA

192.33.144 CERISE-NET

192.33.149 FNET-CMA

192.33.167 FNET-CNAM

192.44.64 FNET

1 9 2 . 5 . 6 0

1 1

2 5

INRIA-FRANCE

1 9 2 . 3 3 . 1 7 0

1 2 9 . 8 8

1 3 0 . 8 4

IMAGGRENOBLE

CIRCE-NET

INRIA

INRIA-SOPHIA

BDBLUES

SUN

KAINA

UNIX

INRIA

X.25-GATE

???????