KOLEN & POLLACK

Figure 26 Figure 29 Figure 30 Figure 27 Figure 28 0 W Weight 1 -0.34959000 -0.34959000 -0.3495900 eight 2 0.00560000 0.00560000 0.00560000 5 W Weight 3 -0.26338813 0.39881098 0.6506070 eight 4 0.75501968 -0.16718577 0.75501968 1 W Weight 5 0.47040862 -0.28598450 0.9128171 eight 6 -0.18438011 -0.18438011 -0.19279729 3 W Weight 7 0.46700363 -0.06778983 0.5618107 eight 8 -0.48619500 0.66061292 0.20220653 9 W Weight 9 0.62821201 -0.39539510 0.1120194 eight 10 -0.90039973 0.55021922 0.67401200 5 W Weight 11 0.48940201 0.35141364 -0.5497887 eight 12 -0.70239312 -0.17438740 -0.69839197 4 W Weight 13 -0.95838741 -0.07619988 -0.1965984 eight 14 0.46940394 0.88460041 0.89221204 0 W Weight 15 -0.73719884 0.67141031 -0.5687974 eight 16 0.96140103 -0.10578894 0.20201484

Table 1: Network Weights for Figures 26 through 30